-- phpMyAdmin SQL Dump
-- http://www.phpmyadmin.net
--
-- Serveur: localhost

SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";

DROP TABLE IF EXISTS `wp_commentmeta`;
CREATE TABLE IF NOT EXISTS `wp_commentmeta` (
  `meta_id` bigint(20) unsigned NOT NULL AUTO_INCREMENT,
  `comment_id` bigint(20) unsigned NOT NULL DEFAULT '0',
  `meta_key` varchar(255) DEFAULT NULL,
  `meta_value` longtext,
  PRIMARY KEY (`meta_id`),
  KEY `comment_id` (`comment_id`),
  KEY `meta_key` (`meta_key`(191))
) ENGINE=MyISAM DEFAULT CHARSET=utf8 AUTO_INCREMENT=1 ;
